尊龙凯时



Legal Statement


This website is established and maintained by Cowealth Medical China Co., Ltd. (hereinafter referred to as “the Company”). Prior to using this website, users are advised to carefully review the following terms.


Declaration of Rights


Unless expressly stated otherwise, the Company holds and retains the intellectual property rights and related rights concerning the materials, information, domain names, company names, trademarks, texts, layout designs, graphics, patterns, images, sounds, processes, programs, and other content or elements presented on this website. These rights are safeguarded under Chinese laws, regulations, legal normative documents, and pertinent international treaties. Violation of these rights may result in civil, administrative, or criminal liabilities.


The company explicitly prohibits any media outlet, website, organization, or individual from reproducing or utilizing the content or elements on this website beyond a reasonable scope without prior written authorization.


Disclaimer


1.This website may include forward-looking statements pertaining to the Company’s business strategies, performance expectations, and industry competition, among other factors. These statements are inherently uncertain and represent the Company’s current viewpoints on future events, without guaranteeing future business performance. The information provided on this website is intended for general display and reference purposes only and should not be construed as legal commitments or statements, nor as advice to users in any manner. It should not be interpreted as the formal confirmation of any offer or transaction. For official materials and information about the Company, kindly refer to press releases or websites authorized by the China Securities Regulatory Commission for the disclosure of information pertaining to listed businesses. Please be aware that investments inherently involve risks. Investors are advised to comprehensively understand the associated risks and be prepared to bear the consequences before making any investment decisions. Investors bear sole responsibility for any gains and losses resulting from their independent investment decisions in financial, securities, and other investment projects based on the information, materials, and graphics presented on this website. The company disclaims any liability for such outcomes.


2.The publication of pertinent articles and materials on this website does not automatically imply an endorsement of their views or verification of their authenticity by the website. Signed articles exclusively reflect the opinions of the authors and do not represent those of the Company.


3.The company does not provide assurance for the stability of the website server and network, nor does it assure the availability of the website for browsing, reading, copying, and usage at all times.‘


4.The links provided on this website are intended to enhance user experience. However, this website does not exert control over the content of the linked sites, and as a result, the Company shall not be held liable for any information found on these sites.


Other Terms


Any disputes or controversies arising from this website shall be governed by the laws of the People’s Republic of China. The competent people’s court shall have jurisdiction over the resolution of any disputes related to this website.




Scan

Follow

【网站地图】【sitemap】