尊龙凯时

Board of Directors

The board of directors of Cowealth Medical Holding Co. Ltd is comprised of nine directors with extensive experience in operation management or professional fields. Among the nine directors, three are independent directors, and the number of independent directors is more than one-fifth of the number of directors.


The term of office of the current directors is 2022.04.28—2025.04.27

Scan

Follow

【网站地图】【sitemap】