尊龙凯时

Future company development strategy

Cowealth Medical Holding Co. Ltd (4745.TW), founded in the Cayman Islands on November 4, 2005, and was listed in Taiwan in January 2013. Headquartered in Shanghai, China, a significant subsidiary Cowealth (China) Medical Technology Co., Ltd. is the largest Taiwan-funded medical channel company in China, focusing on the logistics management services of clinical laboratory equipment, reagents, consumables, and the sales agents of high-end radiotherapy equipment.

“Establishing the market with products, creating scale from the market, and bringing benefits from scale” is the company’s development strategy. International markets of Taiwan, Hong Kong, and Southeast Asia are key priorities for future development.

The Company will continue to introduce cutting-edge technology and management concepts to create a healthy environment for high-quality medical services; it aims to become the largest medical channel company in the Chinese market.

Cowealth China 603122

Shanghai Exchange

Currency: RMB

Last Updated: Beijing Time --

*Data update has a delay of 15-20 minutes

Announcement

  • 2024/04/30Announcement on the 2023 Shareholders' Board Meeting
  • 2024/04/302024 First Quarterly Report
  • 2024/03/232023 Annual Report

Financial Overview

Latest financial report

2024 First Quarterly Report

Announcement Information

Scan

Follow

【网站地图】【sitemap】